XCOMM $XFree86: mit/config/mnx_site.def,v 1.1 1993/03/23 12:56:44 dawes Exp $

/*
 * Minix configuration defines that should require no change.
 */
#ifdef BeforeVendorCF

#define ProjectRoot		MinixConf/$(ARCH).$(TOOLSET)/X11R5

#define CommonMinixDefines	-D_POSIX_C_SOURCE=2 -D_POSIX_SOURCE=2 -D_MINIX=2 -D_PCH_EXT -D_VMD_EXT -D_ARCH=_IBM_386_VM -D_ACK_LIB
#define StandardDefines		CommonMinixDefines
#define StandardCppDefines	StandardDefines

#endif /* BeforeVendorCF */

#ifdef AfterVendorCF

#define	InstallXdmConfig	NO
#define	InstallXinitConfig	NO
#define	InstallFSConfig		NO

#define MinixLibX11		/usr/lib/X11
#define UsrLibDir		MinixLibX11
#define LibDir			MinixLibX11
#define ManDirectoryRoot	MinixLibX11/man
#define IncRoot			MinixLibX11/include
#define FontDir			MinixLibX11/fonts
#define DefaultRGBDatabase      MinixLibX11/rgb
#define BinDir			/usr/X386/bin

#define DefaultUserPath		:/bin:$(BINDIR)
#define DefaultSystemPath	/bin:$(BINDIR):

#define StandardIncludes	-I$(MTOP)/incl -I$(MTOP)/include -I$(MTOP)/include/vmd -I$(MTOP)/include/minix

/* ServerExtraDefines contains -DXDMCP by default */
#ifdef AckToolset
#define	ServerExtraDefines	-DNO_ALLOCA
#else
#ifdef GccGasOption
#define	ServerExtraDefines	GccGasOption
#endif
#endif

#define	Malloc0ReturnsNull	YES
#define FontDefines		-DFONT_SNF
#define ConnectionFlags		-DTCPCONN
#ifndef ExtraFPLoadFlags
#define ExtraFPLoadFlags
#endif
#define OSLibraries		$(MLIB)/libc/libc.a ExtraFPLoadFlags

MTOP		= MinixTop
MLIB		= MinixConf/$(ARCH).$(TOOLSET)/lib
#ifdef AckToolset 
HEAD		=
#else
HEAD		= $(MLIB)/crtso/crtso.o
#endif

ABIN		= MinixBin
AINSTALL	= /bin/sh $(SCRIPTSRC)/aminstall.sh $(ABIN)
AINSTALLFLAGS	=
TOB		= /bin/sh $(SCRIPTSRC)/aminstall.sh $(ABIN)
MKXDIRHIER	= /bin/sh $(SCRIPTSRC)/ammkdirhier.sh $(ABIN)

#endif /* AfterVendorCF */

