XCOMM $XFree86: mit/server/ddx/x386/LinkKit/site.def.LK,v 2.9 1993/10/16 17:30:15 dawes Exp $

/* Configuration file for Server Link Kit */

#ifdef BeforeVendorCF

/*
 * Change these definitions if you need to override the defaults:
 */

/*
 * HasGcc: defaults:
 *		SVR3,4:		YES
 *		Mach, 386bsd:	YES
 */
/* #define HasGcc 		NO */

/*
 * HasGcc2: (should also set HasGcc)
 *	    defaults:
 *		SVR3,4:		YES
 *		Mach:		YES
 *		386bsd:		NO
 */
/* #define HasGcc2		NO */

/*
 * If the link kit you are using was built with gcc2, and you are using
 * a different compiler:
 *   1. Install libgcc.a in a directory searched by your 'ld'
 *   2. Set NeedLibGcc to YES
 */
#define NeedLibGcc		NO

/*
 * Uncomment this if you want to link with the Gnu malloc library
 */
/* #define GnuMalloc	YES */

/*
 * GnuMallocLib: link-time flags to include the Gnu malloc library.
 * this is only used when GnuMalloc is set to YES.
 *	    defaults:
 *		386bsd:		-lgnumalloc
 *		others:		-lgmalloc
 */
/* #define GnuMallocLib		-L/usr/local/gnu -lmalloc */

/*
 * Server configuration parameters
 */

#define FontRenderers		Speedo Type1
#define X386Vga2Drivers		et4000 et3000 pvga1 gvga tvga8900 ncr \
				compaq oak generic
#define X386Vga256Drivers	et4000 et3000 pvga1 gvga ati tvga8900 cirrus \
				ncr compaq oak
#define X386Hga2Drivers		/**/
/* To enable the hga2 driver, replace the above line with the following */
/* #define X386Hga2Drivers		hga6845 */

/*
 * To include the generic banked monochrome driver in the monochrome server,
 * uncomment this with one of the following low level drivers
 * 	hgc1280		[Hyundai HGC-1280 1280x1024]
 *	...
 *	(list is subject to grow)
 */
/* #define X386Bdm2Drivers	hgc1280 */

/* #define XF86S3Drivers		mmio_928 s3_generic */
/*
 * Set which servers to build.  Change the YES to NO for servers you don't
 * want to build.
 */

/* The SVGA colour server */
#define XF86SVGAServer		YES

/* The 16-colour VGA server */
#define XF86VGA16Server		YES

/* The VGA mono server */
#define XF86MonoServer		YES

/* The S3 server */
#define XF86S3Server		YES

/* The IBM 8514/A server */
#define XF86I8514Server		YES

/* The Mach8 server */
#define XF86Mach8Server		YES

/* The Mach32 server */
#define XF86Mach32Server	YES

/* Set the default server (ie the one that gets the sym-link to "X") */
/* #define XFree86DefaultServer	XF86_S3 */

/*
 * If you want PEX (and this link kit was built with PEX support), uncomment
 * the following
 */
/* #define BuildPexExt		YES */

#endif /* BeforeVendorCF */

#ifdef AfterVendorCF

/* If you are using a different ProjectRoot, set it here */

/*
#ifdef ProjectRoot
#undef ProjectRoot
#endif
#define ProjectRoot /usr/X11R5
*/

#endif /* AfterVendorCF */
